INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('APG', 'APG', 'Austrian Power Grid AG',1)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('Amprion', 'Amprion', 'Amprion',2)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('ELES', 'ELES', 'Elektro-Slovenija',3)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('HOPS', 'HOPS', 'Croatian Transmission System Operator',4)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('REE', 'REE', 'Red Eléctrica de España',5)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('TERNA', 'TERNA', 'Terna',6)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('Swissgrid', 'Swissgrid', 'Swissgrid',7)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('FEAS', 'FEAS', 'French Hosting Entity of "ENTSO-E Awareness System"',8)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('GEAS', 'GEAS', 'German Hosting Entity of "ENTSO-E Awareness System"',9)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('TUG', 'TUG', 'TU Graz',10)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('50Hertz', '50Hertz', '50Hertz Transmission',11)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('AEP', 'AEP', 'American Electric Power',12)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('AGP', 'AGP', 'Allegheny Power',13)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('AMR', 'AMR', 'Ameren',14)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('AST', 'AST', 'Augstsgrieguma tīkls',15)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('ATC', 'ATC', 'American Transmission Company',16)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('BCH', 'BCH', 'British Columbia Hydro',17)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('BE', 'BE', 'NSTAR Electric',18)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('BH', 'BH', 'Bangor Hydro-Electric Company',19)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('BPA', 'BPA', 'Bonneville Power Administration',20)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('ČEPS', 'ČEPS', 'ČEPS',21)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('CGES', 'CGES', 'Crnogorski elektroprenosni sistem AD',22)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('CONED', 'CED', 'ConEdison',23)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('Creos', 'Creos', 'Creos Luxembourg',24)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('CX', 'CX', 'Northeast Utilities Services Company',25)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('Cyprus TSO', 'Cyprus TSO', 'Cyprus Transmission System Operator',26)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('DDL', 'DDL', 'Desired Device Locations',27)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('DOM', 'DOM', 'Dominion',28)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('DUKE', 'DUK', 'Duke Power',29)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('EirGrid', 'EirGrid', 'EirGrid',30)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('Elering', 'Elering', 'Elering',31)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('Elia', 'Elia', 'Elia Transmission Belgium',32)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('EMS', 'EMS', 'Elektromreža Srbije',33)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('Energinet', 'Energinet', 'Energinet',34)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('ENT', 'ENT', 'Entergy Services Inc',35)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('ESO', 'ESO', 'Electroenergien Sistemen Operator',36)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('EXE', 'EXE', 'Exelon Energy',37)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('FEN', 'FEN', 'First Energy',38)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('Fingrid', 'Fingrid', 'Fingrid',39)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('FPL', 'FPL', 'Florida Power & Light Company',40)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('HEC', 'HEC', 'Hawaiian Electric Company',41)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('HQC', 'HQC', 'Hydro Quebec',42)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('IPTO', 'IPTO', 'Independent Power Transmission Operator',43)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('ITC', 'ITC', 'International Transmission Company',44)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('Landsnet', 'Landsnet', 'Landsnet',45)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('LAWP', 'LWP', 'Los Angeles Dept of Water and Power',46)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('LIPA', 'LPA', 'Long Island Power Authority',47)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('Litgrid', 'Litgrid', 'Litgrid',48)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('MAM', 'MAM', 'MidAmerican Power',49)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('MAVIR', 'MAVIR', 'Magyar Villamosenergia-ipari Átviteli Rendszerirányító ZRt.',50)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('MDA', 'MDA', 'Ameritech',51)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('MDK', 'MDK', 'Montana-Dakota ',52)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('ME', 'ME', 'Central Maine Power Company',53)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('MEPSO', 'MEPSO', 'MEPSO',54)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('METC', 'MTC', 'Michigan Electric Transmission Co.',55)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('MISO', 'MSO', 'Midwest ISO',56)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('MPC', 'MPC', 'Minnkota Power Collective',57)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('MTB', 'MTB', 'Manitoba Hydro',58)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('NE', 'NE', 'National Grid USA',59)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('NEISO', 'NEI', 'New England ISO',60)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('NH', 'NH', 'Public Service Company of New Hampshire',61)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('NOJA', 'NOJA', 'NOJA Power Switchgear',62)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('NOS BiH', 'NOS BiH', 'BiH Independent System Operator',63)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('NYPA', 'NYP', 'New York Power Authority',64)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('OGE', 'OGE', 'Oklahoma Gas & Electric',65)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('ONS', 'ONS', 'Operador Nacional do Sistema Elétrico',66)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('OST', 'OST', 'Operatori I Sistemit te Transmetimit',67)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('PGE', 'PGE', 'Pacific Gas and Electric',68)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('PJM', 'PJM', 'PJM Interconnection',69)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('PPL', 'PPL', 'PPL Electric Utilities',70)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('PSE', 'PSE', 'Polskie Sieci Elektroenergetyczne',71)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('REN', 'REN', 'Redes Energéticas Nacionais',72)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('RTE', 'RTE', 'Réseau de Transport d''Électricité',73)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('SCE', 'SCE', 'Southern California Edison',74)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('SDGE', 'SDGE', 'San Diego Gas & Electric',75)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('SEPS', 'SEPS', 'Slovenská elektrizačná prenosová sústava',76)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('SOCO', 'SOC', 'Southern Company',77)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('SONI', 'SONI', 'System Operator for Northern Ireland',78)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('SPP', 'SPP', 'Southwest Power Pool',79)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('SSE', 'SSE', 'Scottish and Southern Energy',80)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('Statnett', 'Statnett', 'Statnett',81)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('SVK', 'SVK', 'Svenska Kraftnät',82)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('SWT', 'SWT', 'Southwest (APS and SRP)',83)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('TEİAŞ', 'TEİAŞ', 'Turkish Electricity Transmission Corporation',84)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('TNG', 'TNG', 'Tennet TSO',85)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('TE', 'TE', 'Transelectrica',86)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('TTN', 'TTN', 'TenneT',87)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('TVA', 'TVA', 'Tennessee Valley Authority',88)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('UI', 'UI', 'United Illuminating Company',89)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('Ukrenergo', 'Ukrenergo', 'Ukrenergo',90)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('UTK', 'UTK', 'University of Tennessee, Knoxville',91)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('VE', 'VE', 'Vermont Electric Company',92)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('VUEN', 'VUEN', 'Vorarlberger Übertragungsnetz',93)
GO
INSERT INTO Company(Acronym, MapAcronym, Name, LoadOrder) VALUES ('WAPA', 'WPA', 'Western Area Power Administration',94)
GO
)